051015202530354026.0

0:12:20.0

14.0

08:00.0

30.0

51:07:00.0

06:00.0

05:30.0

RA (J2000)

Dec (J2000)

OBSID 00953689000 / DATE-OBS 2020-01-31T22:42:57.8

UVOT Finding Chart