051015202520.0

10.0

7:11:00.0

28:00.0

30.0

29:00.0

-56:30:00.0

31:00.0

RA (J2000)

Dec (J2000)

OBSID 00954519000 / DATE-OBS 2020-02-05T19:27:59.4

UVOT Finding Chart