051015202538.0

34.0

10:54:30.0

26.0

22.0

34:00.0

30.0

-49:35:00.0

36:00.0

RA (J2000)

Dec (J2000)

OBSID 00954840000 / DATE-OBS 2020-02-07T03:29:50.9

UVOT Finding Chart