02468101222.0

16.0

16:35:10.0

04.0

42:00.0

30.0

41:00.0

41:40:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 00958141000 / DATE-OBS 2020-02-24T03:39:34.8

UVOT Finding Chart