01234567848.0

44.0

3:45:40.0

9:30:00.0

30.0

29:00.0

28:00.0

27:30.0

RA (J2000)

Dec (J2000)

OBSID 00958592000 / DATE-OBS 2020-02-27T07:25:37.7

UVOT Finding Chart