024681012141618.0

12.0

06.0

4:02:00.0

13:00.0

30.0

-50:14:00.0

15:00.0

16:00.0

RA (J2000)

Dec (J2000)

OBSID 00965484000 / DATE-OBS 2020-04-09T03:21:42.4

UVOT Finding Chart