024681019:58:40.0

30.0

47:00.0

51:46:00.0

45:00.0

44:30.0

RA (J2000)

Dec (J2000)

OBSID 00965638000 / DATE-OBS 2020-04-10T02:30:51.9

UVOT Finding Chart