024681012141648.0

44.0

3:10:40.0

36.0

32.0

17:00.0

30.0

-52:18:00.0

19:00.0

RA (J2000)

Dec (J2000)

OBSID 00965784000 / DATE-OBS 2020-04-11T04:43:59.4

UVOT Finding Chart