0123456704.0

5:41:00.0

56.0

40:52.0

26:00.0

30.0

-13:27:00.0

28:00.0

29:00.0

RA (J2000)

Dec (J2000)

OBSID 00967774000 / DATE-OBS 2020-04-25T00:20:59.6

UVOT Finding Chart