024681012141604.0

16:20:00.0

19:56.0

37:00.0

30.0

38:00.0

39:00.0

-15:40:00.0

RA (J2000)

Dec (J2000)

OBSID 00972030000 / DATE-OBS 2020-05-13T15:01:06.7

UVOT Finding Chart