0246810121416182040.0

6:05:30.0

20.0

45:30.0

46:00.0

30.0

-60:47:00.0

48:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00980210000 / DATE-OBS 2020-06-30T01:54:54.3

UVOT Finding Chart