012345678914.0

16:50:10.0

06.0

31:00.0

30.0

15:30:00.0

29:00.0

RA (J2000)

Dec (J2000)

OBSID 00021015001 / DATE-OBS 2020-07-09T06:35:50.7

UVOT Finding Chart