01020304050607019:04:00.0

56.0

03:52.0

06:30.0

07:00.0

30.0

-0:08:00.0

09:00.0

RA (J2000)

Dec (J2000)

OBSID 00981957000 / DATE-OBS 2020-07-11T11:07:51.4

UVOT Finding Chart