012345678954.0

13:29:50.0

46.0

42.0

34:00.0

30.0

-22:35:00.0

36:00.0

37:00.0

RA (J2000)

Dec (J2000)

OBSID 00989458000 / DATE-OBS 2020-08-16T04:12:04.8

UVOT Finding Chart