0510152025301:25:50.0

40.0

30.0

04:00.0

63:03:00.0

02:00.0

RA (J2000)

Dec (J2000)

OBSID 00992099000 / DATE-OBS 2020-08-19T15:49:18.8

UVOT Finding Chart