012345632.0

26.0

14:31:20.0

41:00.0

30.0

42:00.0

-38:43:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 00994165000 / DATE-OBS 2020-09-01T07:24:06.8

UVOT Finding Chart