010203040506070809044.0

5:34:40.0

36.0

32.0

30.0

14:00.0

22:13:00.0

12:00.0

11:30.0

RA (J2000)

Dec (J2000)

OBSID 00994723000 / DATE-OBS 2020-09-05T09:35:56.3

UVOT Finding Chart