02040608010012016:20:00.0

56.0

52.0

19:48.0

50:30.0

51:00.0

30.0

-15:52:00.0

53:00.0

54:00.0

RA (J2000)

Dec (J2000)

OBSID 00994725000 / DATE-OBS 2020-09-05T09:46:57.6

UVOT Finding Chart