051015202508.0

04.0

5:56:00.0

56:00.0

30.0

6:55:00.0

54:00.0

53:00.0

RA (J2000)

Dec (J2000)

OBSID 00995004000 / DATE-OBS 2020-09-07T18:53:00.4

UVOT Finding Chart