51015202530354045.0

30.0

15.0

16:27:00.0

78:24:00.0

23:00.0

22:30.0

RA (J2000)

Dec (J2000)

OBSID 00997453000 / DATE-OBS 2020-09-25T22:05:34.2

UVOT Finding Chart