01234567:09:40.0

30.0

04:00.0

03:00.0

57:02:00.0

01:00.0

00:30.0

RA (J2000)

Dec (J2000)

OBSID 00999948000 / DATE-OBS 2020-10-13T03:51:42.1

UVOT Finding Chart